== Test your setup

To confirm the client was created successfully, you can use the SPA testing application on the https://www.keycloak.org/app/[Keycloak website].

ifeval::[{links-local}==true]
. Open https://www.keycloak.org/app/.
. Click *Save*` to use the default configuration.
endif::[]

ifeval::[{links-local}!=true]
. Open https://www.keycloak.org/app/.
. Change `Keycloak URL` to the URL of your Keycloak instance.
. Click *Save*.
endif::[]

. Click *Sign in* to authenticate to this application using the Keycloak server you started earlier.